\doxysection{osmo\+\_\+icmpv6\+\_\+hdr Struct Reference}
\label{structosmo__icmpv6__hdr}\index{osmo\_icmpv6\_hdr@{osmo\_icmpv6\_hdr}}
\doxysubsection*{Data Fields}
\begin{DoxyCompactItemize}
\item 
\mbox{\label{structosmo__icmpv6__hdr_a5dc180527b7e897f17cb91305053131d}} 
uint8\+\_\+t {\bfseries type}
\item 
\mbox{\label{structosmo__icmpv6__hdr_a7249570032e0275d3fe20f965843ea95}} 
uint8\+\_\+t {\bfseries code}
\item 
\mbox{\label{structosmo__icmpv6__hdr_ae067d0f2c6497dcc5ed2dbea33e8ed47}} 
uint16\+\_\+t {\bfseries csum}
\end{DoxyCompactItemize}


The documentation for this struct was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
include/osmocom/netif/icmpv6.\+h\end{DoxyCompactItemize}
